% Generated by IEEEtran.bst, version: 1.14 (2015/08/26)
\begin{thebibliography}{1}
\providecommand{\url}[1]{#1}
\csname url@samestyle\endcsname
\providecommand{\newblock}{\relax}
\providecommand{\bibinfo}[2]{#2}
\providecommand{\BIBentrySTDinterwordspacing}{\spaceskip=0pt\relax}
\providecommand{\BIBentryALTinterwordstretchfactor}{4}
\providecommand{\BIBentryALTinterwordspacing}{\spaceskip=\fontdimen2\font plus
\BIBentryALTinterwordstretchfactor\fontdimen3\font minus
  \fontdimen4\font\relax}
\providecommand{\BIBforeignlanguage}[2]{{%
\expandafter\ifx\csname l@#1\endcsname\relax
\typeout{** WARNING: IEEEtran.bst: No hyphenation pattern has been}%
\typeout{** loaded for the language `#1'. Using the pattern for}%
\typeout{** the default language instead.}%
\else
\language=\csname l@#1\endcsname
\fi
#2}}
\providecommand{\BIBdecl}{\relax}
\BIBdecl

\bibitem{jemalloc}
\BIBentryALTinterwordspacing
{JEMALLOC}. [Online]. Available: \url{https://jemalloc.net/jemalloc.3.html}
\BIBentrySTDinterwordspacing

\bibitem{cheribsd}
\BIBentryALTinterwordspacing
Benchmark {ABI} - {CheriBSD} 23.11 new features tutorial. [Online]. Available:
  \url{https://www.cheribsd.org/tutorial/23.11/benchmark/index.html}
\BIBentrySTDinterwordspacing

\bibitem{Morello}
\BIBentryALTinterwordspacing
Department of computer science and technology – {CHERI}: The arm morello
  board. [Online]. Available:
  \url{https://www.cl.cam.ac.uk/research/security/ctsrd/cheri/cheri-morello.html}
\BIBentrySTDinterwordspacing

\bibitem{BenchmarkABI}
R.~N.~M. Watson, J.~Clarke, P.~Sewell, J.~Woodruff, S.~W. Moore, G.~Barnes,
  R.~Grisenthwaite, K.~Stacer, S.~Baranga, and A.~Richardson, ``{Early
  performance results from the prototype Morello microarchitecture},''
  University of Cambridge, Computer Laboratory, 15 JJ Thomson Avenue, Cambridge
  CB3 0FD, United Kingdom, phone +44 1223 763500, Tech. Rep. UCAM-CL-TR-986,
  September 2023.

\bibitem{PerformanceCounter}
\BIBentryALTinterwordspacing
Arm architecture reference manual for a-profile architecture. [Online].
  Available: \url{https://developer.arm.com/documentation/ddi0487/latest}
\BIBentrySTDinterwordspacing

\bibitem{Benchmark}
\BIBentryALTinterwordspacing
{CHERI}-allocator/benchmarks/benchmarks/{StressTestMalloc}/glibc-bench.c at
  main · akilan1999/{CHERI}-allocator. [Online]. Available:
  \url{https://github.com/Akilan1999/CHERI-Allocator/blob/main/benchmarks/benchmarks/StressTestMalloc/glibc-bench.c}
\BIBentrySTDinterwordspacing

\end{thebibliography}
